\begin{thebibliography}{10}

\bibitem{NUREG-0899}
{U.S. Nuclear Regulatory Commission}, ``Guidelines for the preparation of emergency operating procedures,'' Tech. Rep. NUREG-0899, U.S. Nuclear Regulatory Commission, 1982.

\bibitem{10CFR50.34}
{U.S. Nuclear Regulatory Commission}, ``{10 CFR Part 50.34}.'' Code of Federal Regulations.

\bibitem{10CFR55.59}
{U.S. Nuclear Regulatory Commission}, ``{10 CFR Part 55.59}.'' Code of Federal Regulations.

\bibitem{WRPS.Description}
``{Westinghouse RPS System Description},'' tech. rep., Westinghouse Electric Corporation.

\bibitem{gentillon_westinghouse_1999}
C.~D. Gentillon, D.~Marksberry, D.~Rasmuson, M.~B. Calley, S.~A. Eide, and T.~Wierman, ``Westinghouse reactor protection system unavailability, 1984-1995.''
\newblock Number: {INEEL}/{CON}-99-00374 Publisher: Idaho National Engineering and Environmental Laboratory.

\bibitem{operator_statistics}
{U.S. Nuclear Regulatory Commission}, ``{Operator Licensing}.'' \url{https://www.nrc.gov/reactors/operator-licensing}.

\bibitem{10CFR55}
{U.S. Nuclear Regulatory Commission}, ``{Part 55—Operators' Licenses}.'' \url{https://www.nrc.gov/reading-rm/doc-collections/cfr/part055/full-text}.

\bibitem{10CFR50.54}
{U.S. Nuclear Regulatory Commission}, ``{§ 50.54 Conditions of Licenses}.'' \url{https://www.nrc.gov/reading-rm/doc-collections/cfr/part050/part050-0054}.

\bibitem{Kemeny1979}
J.~G. Kemeny {\em et~al.}, ``Report of the president's commission on the accident at three mile island,'' tech. rep., President's Commission on the Accident at Three Mile Island, October 1979.

\bibitem{WNA2020}
{World Nuclear Association}, ``Safety of nuclear power reactors.'' \url{https://www.world-nuclear.org/information-library/safety-and-security/safety-of-plants/safety-of-nuclear-power-reactors.aspx}, 2020.

\bibitem{hogberg_root_2013}
L.~Högberg, ``Root causes and impacts of severe accidents at large nuclear power plants,'' vol.~42, no.~3, pp.~267--284.

\bibitem{zhang_analysis_2025}
M.~Zhang, L.~Dai, W.~Chen, and E.~Pang, ``Analysis of human errors in nuclear power plant event reports,'' vol.~57, no.~10, p.~103687.

\bibitem{Kiniry2024}
J.~Kiniry, A.~Bakst, S.~Hansen, M.~Podhradsky, and A.~Bivin, ``High assurance rigorous digital engineering for nuclear safety (hardens) final technical report,'' Tech. Rep. TLR-RES-RES/DE-2024-005, Galois, Inc. / U.S. Nuclear Regulatory Commission, 2024.
\newblock NRC Contract 31310021C0014.

\bibitem{eia_lcoe_2022}
{U.S. Energy Information Administration}, ``Levelized costs of new generation resources in the annual energy outlook 2022,'' report, U.S. Energy Information Administration, March 2022.
\newblock See Table 1b, page 9.

\bibitem{eesi_datacenter_2024}
{Environmental and Energy Study Institute}, ``Data center energy needs are upending power grids and threatening the climate.'' Web article, 2024.
\newblock Accessed: 2025-09-29.

\end{thebibliography}
