\begin{frame}{Nuclear reactors are operated with prescriptive handbooks and
  legacy control technologies}
  \centering
  \includegraphics[width=\textwidth,height=0.75\textheight,keepaspectratio]{images/2_state_of_the_art/control_room.jpg}
\end{frame}

% \begin{frame}{Building a fleet of new reactors with current requirements 
%     will be an incredible staffing challenge
%   }
%   \centering
%   \underline{How many reactor operators are required to staff this new fleet?}
%
%   \vspace{0.3cm}
%
%   \begin{columns}[c]
%     \begin{column}{0.3\textwidth}
%
%       \begin{figure}
%         \includegraphics[width=0.3\textwidth]{images/2_state_of_the_art/nuclear-plant.png}
%         \caption*{For one Small Modular Reactor (SMR)...}
%       \end{figure}
%
%     \end{column}
%
%     \begin{column}{0.7\textwidth}
%       \centering
%       \only<2->{
%         \vspace{0.3cm}
%         \textbf{24/7 operations require \(\sim\)6 shifts:}
%
%         \vspace{0.1cm}
%
%         \begin{tikzpicture}
%           % Adjustable parameters
%           \def\iconsize{0.6cm}
%           \def\xspacing{0.8cm}
%           \def\yspacing{0.9cm}
%
%           % 12 Senior Operators (2 per shift � 6 shifts)
%           \foreach \row in {0,1} {
%             \foreach \col in {0,...,5} {
%               \node at (\col*\xspacing, -\row*\yspacing)
%                 {\includegraphics[width=\iconsize]{images/2_state_of_the_art/foreman.png}};
%             }
%           }
%
%           % 12 Reactor Operators (2 per shift � 6 shifts)
%           \foreach \row in {2,3} {
%             \foreach \col in {0,...,5} {
%               \node at (\col*\xspacing, -\row*\yspacing)
%                 {\includegraphics[width=\iconsize]{images/2_state_of_the_art/worker.png}};
%             }
%           }
%
%           % Labels
%           \node[right] at (6*\xspacing, -0.5*\yspacing) {\small 12 SROs};
%           \node[right] at (6*\xspacing, -2.5*\yspacing) {\small 12 ROs};
%         \end{tikzpicture}
%
%         \vspace{0.1cm}
%         \textbf{24 licensed operators per reactor}
%       }
%
%     \end{column}
%
%   \end{columns}
%
%   \onslide<2->{\vspace{0.2cm} 
%     \large{ 
%       \textbf{To meet demand we require 2,400 new licensed operators!} 
%   } 
% }
%
%
% \onslide<3>{
%   \alert{
%     \textit{We currently have only 3,600 licensed operators total...}
%   }
% }
%
% \end{frame}
%
