\begin{frame}{Key limitations prevent nuclear power from scaling economically}
  \begin{enumerate}
    \item Workforce bottleneck: Training pipeline cannot meet demand

    \item Economic infeasibility of human-dependent operations at scale

    \item Operating procedures lack exhaustive formal verification

    \item Human factors remain dominant cause of incidents
  \end{enumerate}
\end{frame}
