\begin{thebibliography}{10}

\bibitem{10CFR55}
{U.S. Nuclear Regulatory Commission}.
\newblock Operators' licenses.
\newblock 10 CFR Part 55.
\newblock Code of Federal Regulations.

\bibitem{Kemeny1979}
John~G. Kemeny et~al.
\newblock Report of the president's commission on the accident at three mile island.
\newblock Technical report, President's Commission on the Accident at Three Mile Island, October 1979.

\bibitem{NUREG-0899}
{U.S. Nuclear Regulatory Commission}.
\newblock Guidelines for the preparation of emergency operating procedures.
\newblock Technical Report NUREG-0899, U.S. Nuclear Regulatory Commission, 1982.

\bibitem{DOE-HDBK-1028-2009}
{U.S. Department of Energy}.
\newblock Human performance handbook.
\newblock Handbook DOE-HDBK-1028-2009, U.S. Department of Energy, 2009.

\bibitem{WNA2020}
{World Nuclear Association}.
\newblock Safety of nuclear power reactors.
\newblock \url{https://www.world-nuclear.org/information-library/safety-and-security/safety-of-plants/safety-of-nuclear-power-reactors.aspx}, 2020.

\bibitem{IAEA-severe-accidents}
{International Atomic Energy Agency}.
\newblock Human error as root cause in severe nuclear accidents.
\newblock IAEA Safety Report.
\newblock Analysis of TMI, Chernobyl, and Fukushima accidents.

\bibitem{Wang2025}
Y.~Wang et~al.
\newblock Analysis of human error in nuclear power plant operations: A systematic review of events from 2007--2020.
\newblock {\em Journal of Nuclear Safety}, 2025.
\newblock Analysis of 190 events at Chinese nuclear power plants.

\bibitem{NUREG-CR-6883}
D.~Gertman et~al.
\newblock The spar-h human reliability analysis method.
\newblock Technical Report NUREG/CR-6883, U.S. Nuclear Regulatory Commission, 2005.

\bibitem{NUREG-2114}
{U.S. Nuclear Regulatory Commission}.
\newblock Cognitive basis for human reliability analysis.
\newblock Technical Report NUREG-2114, U.S. Nuclear Regulatory Commission, 2016.

\bibitem{Rasmussen1983}
J.~Rasmussen.
\newblock Skills, rules, and knowledge; signals, signs, and symbols, and other distinctions in human performance models.
\newblock {\em IEEE Transactions on Systems, Man, and Cybernetics}, SMC-13(3):257--266, 1983.

\bibitem{Miller1956}
George~A. Miller.
\newblock The magical number seven, plus or minus two: Some limits on our capacity for processing information.
\newblock {\em Psychological Review}, 63(2):81--97, 1956.

\bibitem{Reason1990}
James Reason.
\newblock {\em Human Error}.
\newblock Cambridge University Press, 1990.

\bibitem{Kiniry2022}
Joseph Kiniry, Alexander Bakst, Michal Podhradsky, Simon Hansen, and Andrew Bivin.
\newblock High assurance rigorous digital engineering for nuclear safety (hardens) final technical report.
\newblock Technical Report ML22326A307, Galois, Inc. / U.S. Nuclear Regulatory Commission, 2022.
\newblock NRC Contract 31310021C0014.

\bibitem{eia_lcoe_2022}
{U.S. Energy Information Administration}.
\newblock Levelized costs of new generation resources in the annual energy outlook 2022.
\newblock Report, U.S. Energy Information Administration, March 2022.
\newblock See Table 1b, page 9.

\bibitem{eesi_datacenter_2024}
{Environmental and Energy Study Institute}.
\newblock Data center energy needs are upending power grids and threatening the climate.
\newblock Web article, 2024.
\newblock Accessed: 2025-09-29.

\end{thebibliography}
